#---------------------------------------------------------------------------
#
#                SITE- AND/OR PLATFORM-SPECIFIC DEFINITIONS. 
#
#---------------------------------------------------------------------------

#---------------------------------------------------------------------------
# Items in this file will need to be changed for each platform.
# (Note these definitions are inconsistent with NPB2.1.)
#---------------------------------------------------------------------------

# sinclude Makefile.default
include ../config/Makefile.default
sinclude ../config/Makefile.in

#---------------------------------------------------------------------------
# Destination of executables, relative to subdirs of the main directory. . 
#---------------------------------------------------------------------------
BINDIR	= ../bin


#---------------------------------------------------------------------------
# The variable RAND controls which random number generator 
# is used.
# Use "randi8" unless there is a reason to use another one. 
# Other allowed values are "randi8_safe", "randdp" and "randdpvec"
#---------------------------------------------------------------------------
RAND   = randi8
# The following is highly reliable but may be slow:
# RAND   = randdp


#---------------------------------------------------------------------------
# The variable WTIME is the name of the wtime source code module in the
# NPB2.x/common directory.  
# For most machines,       use wtime.c
# For SGI power challenge: use wtime_sgi64.c
#---------------------------------------------------------------------------
WTIME  = wtime.c


#---------------------------------------------------------------------------
# Enable if either Cray or IBM: 
# (no such flag for most machines: see common/wtime.h)
# This is used by the C compiler to pass the machine name to common/wtime.h,
# where the C/Fortran binding interface format is determined
#---------------------------------------------------------------------------
# MACHINE	=	-DCRAY
# MACHINE	=	-DIBM


